Part 6

Supplementary

Consequential provision

Repeal of Fire Services Act 1947
52
The Fire Services Act 1947 (c. 41) shall cease to have effect.
S. 52 in force at 7.9.2004 for specified purposes except in relation to W. and 1.10.2004 otherwise except in relation to W. by S.I. 2004/2304, art. 2 (with art. 3)
S. 52 in force at 10.11.2004 for W. by S.I. 2004/2917, art. 2