Part 2

Standards
Chapter 10

Supplementary and general

Wales: supplementary

Co-operation between Assembly and CHAI
145
1
The Assembly and the CHAI must co-operate with each other for the efficient and effective discharge of any relevant function.
2
For the purposes of subsection (1), a relevant function is—
a
any function of the CHAI under Chapter 3 of this Part;
b
any function of the Assembly under Chapter 4 or 6 of this Part (other than any function of making regulations);
c
any function of the CHAI under the Care Standards Act 2000;
d
any function of the Assembly exercisable by virtue of section 5(b) or 8(1) to (3) of the Care Standards Act 2000.