Part 8

Miscellaneous

Provisions relating to Northern Ireland

Alteration of place fixed for Crown Court trial: Northern Ireland
104
An application under section 48(3) of the 1978 Act (application for variation of place fixed for Crown Court trial) is no longer required to be heard in open court; and accordingly section 48(4) of the 1978 Act ceases to have effect.