SCHEDULES
SCHEDULE 4

The Valuation Tribunal Service

Execution and proof of instruments
17
1
The application of the seal of the Service shall be authenticated by the signature of any member or employee of the Service who has been authorised for the purpose by the Service, whether generally or specially.
2
Any document which the Service is authorised or required by or under any enactment to serve, make or issue may be signed on behalf of the Service by any member or employee of the Service who has been authorised for the purpose by the Service, whether generally or specially.
3
Every document purporting to be an instrument made or issued by or on behalf of the Service and to be duly executed under the seal of the Service, or to be signed or executed by a person authorised by the Service for the purpose, shall be received in evidence and be treated, without further proof, as being so made or issued unless the contrary is shown.
4
In sub-paragraph (1), the reference to the signature of a person includes a reference to a facsimile of a signature by whatever process reproduced, and “signed” in sub-paragraphs (2) and (3) shall be read accordingly.
Sch. 4 para. 17 in force at 1.4.2004 by S.I. 2003/2938, art. 6(a) (with art. 8, Sch.)