Part 3

Television and Radio Services
Chapter 4

Regulatory provisions

Programme and fairness standards for television and radio

Standards with respect to fairness
327
1
Part 5 of the 1996 Act (functions of the Broadcasting Standards Commission which are transferred to OFCOM so far as they relate to codes of practice and complaints with respect to fairness and privacy) shall be amended as follows.
2
No person shall be entitled to make a standards complaint under that Part at any time after the coming into force of this section, and no person shall be required to entertain any such complaint that is so made.
3
In section 115 (consideration of fairness complaint)—
a
in subsection (4) (matters to be provided in response to a fairness complaint), after paragraph (d) there shall be inserted—
da
to provide OFCOM with such other things appearing to OFCOM to be relevant to their consideration of the complaint, and to be in the possession of the relevant person, as may be specified or described by OFCOM;
b
in subsection (7) (requests in relation to which the relevant person is required to secure the compliance of another), after paragraph (c) there shall be inserted—
ca
a request to provide OFCOM with such other things appearing to OFCOM to be relevant to their consideration of the complaint, and to be in the possession of the person requested, as may be specified or described by OFCOM;
.
4
For subsection (7) of section 119 (directions on determination of fairness complaint) there shall be substituted—
7
The regulatory regime for every licensed service includes the conditions that OFCOM consider appropriate for securing that the licence holder complies with every direction given to him under this section.
7A
Section 263 of the Communications Act 2003 applies in relation to conditions included by virtue of subsection (7) in the regulatory regime for a licensed service as it applies in relation to conditions which are so included by virtue of a provision of Chapter 4 of Part 3 of that Act.
7B
It is hereby declared that, where—
a
OFCOM exercise their powers under this Part to adjudicate upon a fairness complaint or to give a direction under subsection (1), and
b
it appears to them that the matters to which the complaint in question relates consist in or include a contravention of the conditions of the licence for a licensed service,
the exercise by OFCOM of their powers under this Part is not to preclude the exercise by them of their powers under any other enactment in respect of the contravention.
7C
Where OFCOM are proposing to exercise any of their powers in respect of a contravention of a licence condition in a case in which the contravention relates to matters that have been the subject-matter of a fairness complaint—
a
OFCOM may have regard, in the exercise of those powers, to any matters considered or steps taken by them for the purpose of adjudicating upon that complaint and to any direction given by them under this section; but
b
steps taken for the purposes of this Part do not satisfy a requirement to give the licence holder in relation to whom those powers are to be exercised a reasonable opportunity, before they are exercised, of making representations to OFCOM.
5
For subsection (2) of section 120 of that Act (reports on supplementary action taken in response to findings on fairness complaint) there shall be substituted—
2
Where the relevant programme was included in a licensed service, the licence holder shall send to OFCOM a report of any supplementary action taken by him or by any other person responsible for the making or provision of the relevant programme.