SCHEDULES
SCHEDULE 17

Minor and Consequential Amendments

Drainage (Northern Ireland) Order 1973
45
In paragraph 3 of Schedule 9 to the Drainage (Northern Ireland) Order 1973 (S.I. 1973/69 (N.I. 1))—
a
for “telecommunication apparatus”, wherever occurring, there shall be substituted “ electronic communications apparatus ”;
b
for “a telecommunications code system”, wherever occurring, there shall be substituted “ an electronic communications code network ”;
c
for “telecommunications code”, wherever occurring (except in the expression “telecommunications code system”), there shall be substituted “ electronic communications code ”;
d
for “any such system” and “that system” there shall be substituted, respectively, “ any such network ” and “ that network ”.
Sch. 17 para. 45 in force at 25.7.2003 for specified purposes by S.I. 2003/1900, arts. 1(2), 2(1), Sch. 1 (with art. 3) (as amended by S.I. 2003/3142, art. 1(3))
Sch. 17 para. 45 in force at 29.12.2003 in so far as not already in force by S.I. 2003/3142, art. 3(2) (with art. 11)