SCHEDULES
SCHEDULE 17

Minor and Consequential Amendments

Thames Barrier and Flood Prevention Act 1972
43
In section 20(1)(a) of the Thames Barrier and Flood Prevention Act 1972 (c. xlv)(power to make subsidiary works etc.), for “telecommunication installations” there shall be substituted “ electronic communications installations ”.
Sch. 17 para. 43 in force at 25.7.2003 for specified purposes by S.I. 2003/1900, arts. 1(2), 2(1), Sch. 1 (with art. 3) (as amended by S.I. 2003/3142, art. 1(3))
Sch. 17 para. 43 in force at 29.12.2003 in so far as not already in force by S.I. 2003/3142, art. 3(2) (with art. 11)