Part 3

Premises licences

Transfer of premises licence

Duty to notify designated premises supervisor of transfer
46
1
This section applies where—
a
an application is made in accordance with section 42 to transfer a premises licence in respect of which there is a designated premises supervisor, and
b
the applicant and that supervisor are not the same person.
2
Where section 43(1) applies in relation to the application, the applicant must forthwith notify the designated premises supervisor of the application.
3
If the application is granted, the applicant must forthwith notify the designated premises supervisor of the transfer.
4
A person commits an offence if he fails, without reasonable excuse, to comply with this section.
5
A person guilty of an offence under subsection (4) is liable on summary conviction to a fine not exceeding level 3 on the standard scale.