Penalties
16
1
A person guilty of an offence under section 15(1) is liable on summary conviction to a fine not exceeding level 3 on the standard scale.
1A. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2
A person guilty of an offence under or by virtue of any other provision of this Act is liable—
a
on summary conviction to imprisonment for a term not exceeding six months, or a fine not exceeding the statutory maximum, or both, or
b
on conviction on indictment to imprisonment for a term not exceeding 2 years, or a fine, or both.
S. 16 wholly in force at 14.2.2003; s. 16 not in force at Royal Assent see s. 22(1)(2); s. 16 wholly in force at 14.2.2003 by S.I. 2002/2865, art. 2(2)(i); S.S.I. 2002/512, art. 2(2)(i)
Words in s. 16(2)(a) substituted (12.1.2010) by Health Act 2009 (c. 21), s. 40(7)(b), Sch. 4 para. 9(3)
S. 16(1A) repealed (12.11.2009) by Health Act 2009 (c. 21), s. 40(5)(a), Sch. 4 para. 9(2), Sch. 6 (with Sch. 4 para. 9(4))