Part 2

Health and Social Care Professions etc.

The Professional Standards Authority for Health and Social Care

References under section 29: role of the General Medical Council
29A
1
If
the Authority
makes a reference under section 29 of a case involving a relevant decision such as is mentioned in subsection (8)(d) of that section—
a
the Authority
must without delay give the General Medical Council notice of the reference; and
b
the General Medical Council may not bring an appeal under section 40A of the Medical Act 1983 against the decision.
2
Where the General Medical Council is the respondent in the case of a reference under section 29, the matters which it may raise on the reference include any matter that it could have raised on an appeal against the relevant decision under section 40A of the Medical Act 1983.
3
If the General Medical Council is the respondent in the case of a reference under section 29, and
the Authority
either wishes to withdraw the reference or, having agreed the terms of a settlement of the case with the person to whom the relevant decision relates, wishes the case to be disposed of on those terms,
the Authority
must give notice of its wish to the Council.
4
The General Medical Council, having received a notice under subsection (3), must by notice inform the relevant court,
the Authority
and the person concerned whether it wishes the proceedings on the reference to continue.
5
Where the General Medical Council gives notice under subsection (4) that it wishes the proceedings to continue, they are to continue but, from the time when the Council gives its notice to the relevant court under subsection (4), are to be treated as proceedings on an appeal made by the Council under section 40A of the Medical Act 1983.
6
In a case within subsection (5), the General Medical Council must give notice to the relevant court,
the Authority
and the person concerned specifying the grounds of its case; and—
a
the person concerned has the opportunity to respond accordingly, and
b
the Authority
has the opportunity to become a party to the appeal by virtue of section 40B(2) of the Medical Act 1983.
7
A requirement in this section to give a notice to a specified person is in addition to such requirements as are imposed by rules of court in relation to the persons to whom notice is to be given; and the giving of notice under this section is subject to such other requirements relating to the giving of notices as are imposed by rules of court.
8
In this section, “relevant court” and “relevant decision” each have the same meaning as in section 29.
Pt. 2 title substituted (1.12.2012) by Health and Social Care Act 2012 (c. 7), ss. 222(5), 306(4); S.I. 2012/2657, art. 2(3)
S. 25 crossheading substituted (1.12.2012) by Health and Social Care Act 2012 (c. 7), ss. 222(4), 306(4); S.I. 2012/2657, art. 2(3)
S. 29A inserted (31.12.2015) by The General Medical Council (Fitness to Practise and Over-arching Objective) and the Professional Standards Authority for Health and Social Care (References to Court) Order 2015 (S.I. 2015/794), arts. 1(3), 18(9); S.I. 2015/1952, art. 2(l) (with Sch. para. 3)