Part 3

Industrial buildings allowances
Chapter 3

The relevant interest in the building

Effect of creation of subordinate interest
288
1
An interest does not cease to be the relevant interest merely because of the creation of a lease or other interest to which that interest is subject.
2
This is subject to any election under section 290.
Pt. 3 modified (24.2.2003) by Proceeds of Crime Act 2002 (c. 29), s. 458(1), Sch. 10 para. 18 (with Sch. 10 para. 21); S.I. 2003/120, art. 2, Sch. (with arts. 3 4) (as amended (20.2.2003) by S.I. 2003/333, art. 14)
S. 45H(2) modified (with effect in accordance with s. 167 of the amending Act) by Finance Act 2003 (c. 14) , Sch. 30 para. 7
Pt. 3 modified (5.10.2004) by Energy Act 2004 (c. 20) , s. 198(2) , Sch. 4 para. 5 ; S.I. 2004/2575 , art. 2(1) , Sch. 1
Pt. 3 modified (E.W.S.) (8.6.2005) by Railways Act 2005 (c. 14), s. 60(2), Sch. 10 para. 4; S.I. 2005/1444, art. 2(1), Sch. 1
Pt. 3 modified (8.6.2005) by Railways Act 2005 (c. 14), s. 60(2), Sch. 10 para. 15; S.I. 2005/1444, art. 2(1), Sch. 1
Pt. 3 modified (24.7.2005) by Railways Act 2005 (c. 14), s. 60(2), Sch. 10 para. 24; S.I. 2005/1909, art. 2, Sch.
Pt. 3 restricted (19.7.2007) by Finance Act 2007 (c. 11), s. 36(1)-(3), (7)
Pt. 3 omitted (with effect in relation to chargeable periods beginning on or after 1.4.2011 for corporation tax purposes and 6.4.2011 for income tax purposes in accordance with ss. 84(1)(3)(4), 85, 86 of the amending Act) by virtue of Finance Act 2008 (c. 9), s. 84(2) (with Sch. 27)
Pt. 3 modified (22.7.2008) by Crossrail Act 2008 (c. 18), Sch. 13 para. 21(1)
Pt. 3 modified (22.7.2008) by Crossrail Act 2008 (c. 18), Sch. 13 para. 38(1)