Part 3

Industrial buildings allowances
Chapter 2

Industrial buildings

Supplementary provisions

Cessation of use and temporary disuse of building
285
For the purposes of this Part—
a
a building is not to be regarded as ceasing altogether to be used merely because it falls temporarily out of use, and
b
if a building is an industrial building immediately before a period of temporary disuse, it is to be treated as being an industrial building during the period of temporary disuse.
Pt. 3 modified (24.2.2003) by Proceeds of Crime Act 2002 (c. 29), s. 458(1), Sch. 10 para. 18 (with Sch. 10 para. 21); S.I. 2003/120, art. 2, Sch. (with arts. 3 4) (as amended (20.2.2003) by S.I. 2003/333, art. 14)
S. 45H(2) modified (with effect in accordance with s. 167 of the amending Act) by Finance Act 2003 (c. 14) , Sch. 30 para. 7
Pt. 3 modified (5.10.2004) by Energy Act 2004 (c. 20) , s. 198(2) , Sch. 4 para. 5 ; S.I. 2004/2575 , art. 2(1) , Sch. 1
Pt. 3 modified (E.W.S.) (8.6.2005) by Railways Act 2005 (c. 14), s. 60(2), Sch. 10 para. 4; S.I. 2005/1444, art. 2(1), Sch. 1
Pt. 3 modified (8.6.2005) by Railways Act 2005 (c. 14), s. 60(2), Sch. 10 para. 15; S.I. 2005/1444, art. 2(1), Sch. 1
Pt. 3 modified (24.7.2005) by Railways Act 2005 (c. 14), s. 60(2), Sch. 10 para. 24; S.I. 2005/1909, art. 2, Sch.
Pt. 3 restricted (19.7.2007) by Finance Act 2007 (c. 11), s. 36(1)-(3), (7)
Pt. 3 omitted (with effect in relation to chargeable periods beginning on or after 1.4.2011 for corporation tax purposes and 6.4.2011 for income tax purposes in accordance with ss. 84(1)(3)(4), 85, 86 of the amending Act) by virtue of Finance Act 2008 (c. 9), s. 84(2) (with Sch. 27)
Pt. 3 modified (22.7.2008) by Crossrail Act 2008 (c. 18), Sch. 13 para. 21(1)
Pt. 3 modified (22.7.2008) by Crossrail Act 2008 (c. 18), Sch. 13 para. 38(1)