Part VI

Official Listing
Compensation for false or misleading statements
etc

Liability of issuers in connection with published information
90A
Schedule 10A makes provision about the liability of issuers of securities to pay compensation to persons who have suffered loss as a result of—
a
a misleading statement or dishonest omission in certain published information relating to the securities, or
b
a dishonest delay in publishing such information.
Pt. 6 (ss. 72-103) applied (with modifications) (1.12.2001) by S.I. 1995/1537, Sch. 4 (as amended (1.12.2001) by S.I. 2001/3649, arts. 1, 511)
Ss. 90A, 90B inserted (8.11.2006) by Companies Act 2006 (c. 46), ss. 1270, 1300(1)(a)
S. 90 cross-heading substituted (8.11.2006) by Companies Act 2006 (c. 46), ss. 1272, 1300(1)(a), Sch. 15 para. 4
S. 90A substituted (1.10.2010 with effect in accordance with reg. 3(1) of the amending S.I.) by The Financial Services and Markets Act 2000 (Liability of Issuers) Regulations 2010 (S.I. 2010/1192), reg. 2(2) (with reg. 3(2))
Pt. 6 modified (31.12.2020) by The Official Listing of Securities, Prospectus and Transparency (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/707), regs. 1(2), 73 (as amended by S.I. 2019/1234, regs. 1(2), 23 and with savings in S.I. 2019/680, reg. 11 (as amended by S.I. 2019/1234, regs. 1(3), 29(2)))); 2020 c. 1, Sch. 5 para. 1(1)