Part XV

The Financial Services Compensation Scheme

Relationship with the regulators

Co-operation
217A
1
Each regulator and the scheme manager must take such steps as they consider appropriate to co-operate with each other in the exercise of their functions under this Part and Part 15A.
2
Each regulator and the scheme manager must prepare and maintain a memorandum describing how that regulator and the scheme manager intend to comply with subsection (1).
3
The scheme manager must ensure that the memoranda as currently in force are published in the way appearing to it to be best calculated to bring them to the attention of the public.
Pt. XV (ss. 212-224) excluded (27.4.2002) by The Financial Services and Markets Act 2000 (Regulated Activities) Order 2001 (S.I. 2001/544), art. 9J (as inserted by The Financial Services and Markets Act 2000 (Regulated Activities) (Amendment) Order 2002 (S.I. 2002/682), arts. 1(2), 4)
Pt. XV (ss. 212-224) modified (2.7.2002) by The Financial Services and Markets Act 2000 (Consequential Amendments and Transitional Provisions) (Credit Unions) Order 2002 (S.I. 2002/1501), art. 5
Pt. 15 modified (29.9.2008 at 8.00 a.m.) by The Bradford & Bingley plc Transfer of Securities and Property etc. Order 2008 (S.I. 2008/2546), art. 29 (with art. 30(6))
Pt. 15 modified (7.10.2008 at 9.30 a.m.) by The Heritable Bank plc Transfer of Certain Rights and Liabilities Order 2008 (S.I. 2008/2644), art. 14 (with art. 15(8)
Pt. 15 modified (8.10.2008 at 12.15 p.m.) by The Kaupthing Singer & Friedlander Limited Transfer of Certain Rights and Liabilities Order 2008 (S.I. 2008/2674), art. 15 (with art. 16(8))
S. 217A and cross-heading inserted (24.1.2013 for specified purposes, 1.4.2013 in so far as not already in force) by Financial Services Act 2012 (c. 21), s. 122(3), Sch. 10 para. 7 (with Sch. 20); S.I. 2013/113, art. 2(1)(c), Sch. Pt. 3; S.I. 2013/423, art. 3, Sch.