Functions
2
1
The Chief Inspector shall—
a
inspect or arrange for the inspection of the operation of the Crown Prosecution Service,
b
report to the Attorney General on any matter connected with the operation of the Service which the Attorney General refers to him, and
c
submit an annual report to the Attorney General on the operation of the Service.
2
The Attorney General shall lay before Parliament a copy of any report which he receives under subsection (1)(c).
3
The Chief Inspector may designate an inspector to discharge his functions during any period when he is absent or unable to act.