Part I

Listed Buildings
Chapter II

Authorisation of Works Affecting Listed Buildings

Grant of consent subject to conditions

Application for variation or discharge of conditions.
17
1
Any person interested in a listed building with respect to which listed building consent has been granted subject to conditions may apply to the planning authority for the variation or discharge of the conditions.
2
The application shall indicate what variation or discharge of conditions is applied for and the provisions of sections 9 to 13, 14(3) and 18 to 20 apply to such an application as they apply to an application for listed building consent.
3
On such an application the planning authority or, as the case may be, the Secretary of State may vary or discharge the conditions attached to the consent, and may add new conditions consequential upon the variation or discharge, as they or he think fit.
Ss. 6-25 applied (with modifications) (1.10.2015) by The Planning (Listed Building Consent and Conservation Area Consent Procedure) (Scotland) Regulations 2015 (S.S.I. 2015/243), regs. 1, 15, sch. 3 (with reg. 2)