Part II

Digital terrestrial sound broadcasting

General provisions about licences

General licence conditions
43
1
A licence may include—
a
such conditions as appear to the Authority to be appropriate having regard to any duties which are or may be imposed on them, or on the licence holder, by or under the 1990 Act or this Act;
b
conditions enabling the Authority to supervise and enforce technical standards in connection with the provision of the licensed service;
c
conditions requiring the payment by the licence holder to the Authority (whether on the grant of the licence or at such times thereafter as may be determined by or under the licence, or both) of a fee or fees of an amount or amounts so determined;
d
conditions requiring the licence holder to furnish the Authority, in such manner and at such times as they may reasonably require, with such information as they may require for the purpose of exercising the functions assigned to them by or under this Act;
e
conditions requiring the licence holder, if found by the Authority to be in breach of any condition of his licence, to reimburse to the Authority, in such circumstances as are specified in any conditions, any costs reasonably incurred by them in connection with the breach of that condition;
f
conditions providing for such incidental and supplemental matters as appear to the Authority to be appropriate.
2
A licence may in particular include—
a
conditions requiring the licence holder—
i
to comply with any direction given by the Authority as to such matters as are specified in the licence or are of a description so specified, or
ii
(except to the extent that the Authority consent to his doing or not doing them) not to do or to do such things as are specified in the licence or are of a description so specified; and
b
conditions requiring the licence holder to permit—
i
any employee of, or person authorised by, the Authority, or
ii
any officer of, or person authorised by, the Secretary of State,
to enter any premises which are used in connection with the broadcasting of the licensed service and to inspect, examine, operate or test any equipment on the premises which is used in that connection.
3
The fees required to be paid to the Authority by virtue of subsection (1)(c) shall be in accordance with such tariff as may from time to time be fixed by the Authority; and the amount of any fee which is to be so paid by the holder of a licence of a particular class or description shall be such as to represent what appears to the Authority to be the appropriate contribution of the holder of such a licence towards meeting the sums which the Authority regard as necessary in order to discharge their duty under paragraph 12(1) of Schedule 8 to the 1990 Act.
4
A tariff fixed under subsection (3) may specify different fees in relation to different cases or circumstances; and the Authority shall publish every such tariff in such manner as they consider appropriate.
5
Where the holder of any licence—
a
is required by virtue of any condition imposed under this Part to provide the Authority with any information, and
b
in purported compliance with that condition provides them with any information which is false in a material particular,
he shall be taken for the purposes of sections 59, 62 and 66 of this Act and section 111 of the 1990 Act to have failed to comply with that condition.
6
Nothing in this Act which authorises or requires the inclusion in a licence of conditions relating to any particular matter or having effect for any particular purpose shall be taken as derogating from the generality of subsection (1).