Part I

Trade Unions
Chapter I

Introductory

Certification as independent trade union

Conclusive effect of Certification Officer’s decision.
8
1
A certificate of independence which is in force is conclusive evidence for all purposes that a trade union is independent; and a refusal, withdrawal or cancellation of a certificate of independence, entered on the record, is conclusive evidence for all purposes that a trade union is not independent.
2
A document purporting to be a certificate of independence and to be signed by the Certification Officer, or by a person authorised to act on his behalf, shall be taken to be such a certificate unless the contrary is proved.
3
A document purporting to be a certified copy of an entry on the record and to be signed by the Certification Officer, or by a person authorised to act on his behalf, shall be taken to be a true copy of such an entry unless the contrary is proved.
4
If in any proceedings before a court, the Employment Appeal Tribunal, the Central Arbitration Committee, ACAS or an employment tribunal a question arises whether a trade union is independent and there is no certificate of independence in force and no refusal, withdrawal or cancellation of a certificate recorded in relation to that trade union—
a
that question shall not be decided in those proceedings, and
b
the proceedings shall instead be stayed or sisted until a certificate of independence has been issued or refused by the Certification Officer.
5
The body before whom the proceedings are stayed or sisted may refer the question of the independence of the trade union to the Certificate Officer who shall proceed in accordance with section 6 as on an application by that trade union.
Words in s. 8(4) substituted (1.8.1998) by 1998 c. 8, s. 1(2)(a) (with s. 16(2)); S.I. 1998/1658, art. 2(1), Sch. 1