...

Disability Living Allowance Advisory Board
175. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
S. 175 repealed (7.2.2013) by The Public Bodies (Abolition of the Disability Living Allowance Advisory Board) Order 2013 (S.I. 2013/252), art. 1(2), Sch. Pt. 1
S. 175 cross-heading repealed (7.2.2013) by The Public Bodies (Abolition of the Disability Living Allowance Advisory Board) Order 2013 (S.I. 2013/252), art. 1(2), Sch. Pt. 1