Part I

Listed Buildings
Chapter III

Rights of Owners etc.

Compensation

Compensation for loss or damage caused by interim protection
28B. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
S. 28B omitted (4.11.2024) by virtue of Historic Environment (Wales) Act 2023 (asc 3), s. 212(2), Sch. 13 para. 115 (with Sch. 14 paras. 1-3); S.I. 2024/860, art. 3(d)