SCHEDULES
SCHEDULE 5

Application of seal and proof of instruments
5
The application of the seal of the Board shall be authenticated by the signature of—
a
the Chairman or any other member of the Board; and
b
a member of the Board’s staff who has been authorised by the Board for the purpose, whether generally or specifically.
Sch. 5 para. 5 in force 1. 4. 1991 see s. 124(3) and S.I. 1991/608, art. 2, Sch.
Sch. 5 repealed (31.3.2009) by Legal Services Act 2007 (c. 29), ss. 208, 210, 211, Sch. 21 para. 100(b), Sch. 23 (with ss. 29, 192, 193); S.I. 2009/503, art. 2(d)(f)(vi)(bb)