SCHEDULES
SCHEDULE 1

Application of seal and proof of instruments
5
The application of the seal of the Advisory Committee shall be authenticated by the signature of—
a
the Chairman or any other member of the Advisory Committee; and
b
a member of the Advisory Committee’s staff who has been authorised by the Advisory Committee for the purpose, whether generally or specifically.
Sch. 1 repealed (1.1.2000) by 1999 c. 22, s. 106, Sch. 15 Pt. II (with Sch. 14 paras. 7(2), 36(9)); S.I. 1999/3344, art. 2(d), Sch. 1 para. 4
Sch. 1 para. 5 in force 1. 4. 1991 see s. 124(3) and S.I. 1991/608, art. 2, Sch.