SCHEDULES
SCHEDULE 3A

SUPPLEMENTARY LICENCE CONDITIONS: HUMAN APPLICATION

Traceability and coding system
1
Licence conditions shall require that all persons to whom a licence applies adopt such systems as the Authority considers appropriate to secure—
a
in relation to traceability, compliance with the requirements of Article 8 (traceability) of the first Directive and Article 9 (traceability) of the third Directive, and
b
in relation to the coding of information, compliance with the requirements of Article 25 (coding of information) of the first Directive and Article 10 (European coding system) of the third Directive.
2
Licence conditions imposed in accordance with paragraph 1 may specify the coding system which must be applied in relation to gametes and embryos intended for human application.
Sch. 3A inserted (25.5.2007 for certain purposes, otherwise 5.7.2007) by The Human Fertilisation and Embryology (Quality and Safety) Regulations 2007 (S.I. 2007/1522), regs 1, 30