Part I

ELECTRICITY SUPPLY

Protection of public interest

Onshore wind generating stations accredited, or additional capacity added, on or before the onshore wind closure date
32LD
The circumstances set out in this section are where the electricity is—
a
generated by an onshore wind generating station which was accredited on or before the onshore wind closure date, and
b
generated using—
i
the original capacity of the station, or
ii
additional capacity which in the Authority's view first formed part of the station on or before the onshore wind closure date.
Pt. I (ss. 1-64) amended (E.W.) (27.10.2000) by S.I. 2000/2727, art. 10
Pt. I (ss. 1-64) amended (7.11.2000) by 2000 c. 27, s. 105(1)(a); S.I. 2000/2974, art. 2, Sch. (subject to transitional provisions in arts. 3-12)
Pt. I (ss. 1-64) amended (E.W.) (1.10.2001) by S.I. 2000/2727, art. 10 (as substituted (1.10.2001) by S.I. 2001/3268, art. 2(13))
Pt. I (ss. 1-64) applied (1.10.2001) by S.I. 2001/3264, regs. 4(2), 5(2)
Pt. I modified (S.) (30.11.2005) by The Electricity from Non-Fossil Fuel Sources (Scotland) Saving Arrangements Order 2005 (S.S.I. 2005/549), arts. 1(1), 9
Pt. I modified (5.10.2004) by Energy Act 2004 (c. 20), ss. 184(12), 185(13), 198(2); S.I. 2004/2575, art. 2(1), Sch. 1
Pt. 1 excluded (30.12.2015) by The Port Talbot Steelworks Generating Station Order 2015 (S.I. 2015/1984), arts. 1, 7(2) (with art. 26)
Ss. 32LD-32LL inserted (12.5.2016) by Energy Act 2016 (c. 20), ss. 80(2), 84(1)