Part I

Gas Supply

Gas transmission and the operation of gas interconnectors: independence

Report where applicant connected with a country outside the United Kingdom
8E
1
This section applies if the Secretary of State is notified by
the Authority
under section 8D(3) that an application has been made by a person from a
country outside the United Kingdom
or a person controlled by a person from a
country outside the United Kingdom
.
2
The Secretary of State must prepare a report on whether the security of gas supplies in the United Kingdom
...
would be put at risk by the certification of the applicant.
3
The Secretary of State must prepare the report and send it to
the Authority
within the 6 weeks beginning with the day on which the notification under section 8D(3) is received.
4
If, before the Secretary of State sends the report to
the Authority
,
the Authority
receives information under section 8D(4) or (5) and thinks that the information is relevant to the preparation of the report,
the Authority
must supply that information to the Secretary of State as soon as is reasonably practicable.
5
In preparing the report, the Secretary of State must take into account—
a
any relevant international law; and
b
any relevant agreement between the government of the United Kingdom and the government of the
... country in question.
Pt. I: definition of "public gas supplier" applied (E.W.) (1.12.1991) by Water Resources Act 1991 (c. 57, SIF 130), ss. 208(3)(b), 225(2) (with ss. 16(6), 179, 222(3), Sch. 22 para. 1, Sch. 23 para. 6)
Pt. I: definition of "public gas supplier" applied (E.W.) (1.12.1991) by Water Resources Act 1991 (c. 57, SIF 130), ss. 178, 225(2), Sch. 22 para. 1(4)(e) (with ss. 16(6), 179, 222(3), Sch. 22 para. 1, Sch. 23 para. 6)
Pt. I applied (1.3.1996) by 1995 c. 45, s. 6(7); S.I. 1996/218, art. 2
Pt. I applied (1.3.1996) by 1995 c. 45, s. 16(1), Sch. 4 para. 1; S.I. 1996/218, art. 2
Words in s. 8E heading substituted (31.12.2020) by The Electricity and Gas etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/530), regs. 1(1), 13(2) (with reg. 14) (as amended by S.I. 2020/1016, regs. 1(2), 3(3)); 2020 c. 1, Sch. 5 para. 1(1)
Words in s. 8E(1) substituted (31.12.2020) by The Electricity and Gas etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/530), regs. 1(1), 13(3) (with reg. 14) (as amended by S.I. 2020/1016, regs. 1(2), 3(3)); 2020 c. 1, Sch. 5 para. 1(1)
Word in s. 8E(5)(b) omitted (31.12.2020) by virtue of The Electricity and Gas etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/530), regs. 1(1), 13(5) (with reg. 14) (as amended by S.I. 2020/1016, regs. 1(2), 3(3)); 2020 c. 1, Sch. 5 para. 1(1)
Ss. 8C-8Q and cross-heading inserted (10.11.2011) by The Electricity and Gas (Internal Markets) Regulations 2011 (S.I. 2011/2704), regs. 1(1), 4
Words in s. 8E(2) omitted (31.12.2020) by virtue of The Electricity and Gas etc. (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/530), regs. 1(1), 13(4) (with reg. 14) (as amended by S.I. 2020/1016, regs. 1(2), 3(3)); 2020 c. 1, Sch. 5 para. 1(1)