Part I

Gas Supply

Licensing of activities relating to gas

Licensing of a person performing code manager function
7AC
1
The Authority may grant a licence (“a code manager licence”) authorising a person to perform the function of code manager in respect of a designated gas licence document.
2
Where a designated gas licence document is also a designated electricity licence document, a person may not be granted a code manager licence in respect of the document unless the same person is at the same time granted a licence under section 6(1)(g) of the Electricity Act 1989.
3
In this section—
- “
designated electricity licence document
” has the same meaning as in section 4 of the Electricity Act 1989;
- “
designated gas licence document
” has the same meaning as in section 5.
Pt. I: definition of "public gas supplier" applied (E.W.) (1.12.1991) by Water Resources Act 1991 (c. 57, SIF 130), ss. 208(3)(b), 225(2) (with ss. 16(6), 179, 222(3), Sch. 22 para. 1, Sch. 23 para. 6)
Pt. I: definition of "public gas supplier" applied (E.W.) (1.12.1991) by Water Resources Act 1991 (c. 57, SIF 130), ss. 178, 225(2), Sch. 22 para. 1(4)(e) (with ss. 16(6), 179, 222(3), Sch. 22 para. 1, Sch. 23 para. 6)
Pt. I applied (1.3.1996) by 1995 c. 45, s. 6(7); S.I. 1996/218, art. 2
Pt. I applied (1.3.1996) by 1995 c. 45, s. 16(1), Sch. 4 para. 1; S.I. 1996/218, art. 2
S. 5 and cross-heading preceding it substituted (1.3.1996) by 1995 c. 45, s. 3; S.I. 1996/218, art. 2
S. 7AC inserted (10.9.2024) by Energy Act 2023 (c. 52), ss. 185(6), 334(1); S.I. 2024/890, reg. 2(b)(ii)