Part I

Gas Supply

Standards of performance

Overall standards of performance: gas transporters.
33BA
1
The Authority may from time to time—
a
determine such standards of overall performance in connection with the activities of gas transporters as, in its opinion, ought to be achieved by them; and
b
arrange for the publication, in such form and in such manner as he considers appropriate, of the standards so determined.
2
Different standards may be determined for different gas transporters if the Authority is of the opinion that the differences are such that no gas transporter would be unduly disadvantaged in competing with other gas transporters.
3
It shall be the duty of every gas transporter to conduct his business in such a way as can reasonably be expected to lead to his achieving the standards set under this section.
Pt. I: definition of "public gas supplier" applied (E.W.) (1.12.1991) by Water Resources Act 1991 (c. 57, SIF 130), ss. 208(3)(b), 225(2) (with ss. 16(6), 179, 222(3), Sch. 22 para. 1, Sch. 23 para. 6)
Pt. I: definition of "public gas supplier" applied (E.W.) (1.12.1991) by Water Resources Act 1991 (c. 57, SIF 130), ss. 178, 225(2), Sch. 22 para. 1(4)(e) (with ss. 16(6), 179, 222(3), Sch. 22 para. 1, Sch. 23 para. 6)
Pt. I applied (1.3.1996) by 1995 c. 45, s. 6(7); S.I. 1996/218, art. 2
Pt. I applied (1.3.1996) by 1995 c. 45, s. 16(1), Sch. 4 para. 1; S.I. 1996/218, art. 2
Cross heading, ss. 33A and 33B inserted (1.7.1992) by Competition and Service (Utilities) Act 1992 (c. 43), s. 11; Commencement Order No. 1 made on 29.5.1992, art. 3, Sch. Pt.I.
S. 33BA inserted (16.5.2001 for certain purposes and otherwise 1.10.2001) by 2000 c. 27, s. 91; S.I. 2001/1781, art. 2, Sch. (subject to transitional provisions in arts. 3-10); S.I. 2001/3266, arts. 1(2), 2, Sch. (subject to transitional provisions in arts. 3-20)