Part I

Gas Supply

Pipe-line systems, storage facilities and LNG import or export facilities: rights of use etc
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 20
Pt. I: definition of "public gas supplier" applied (E.W.) (1.12.1991) by Water Resources Act 1991 (c. 57, SIF 130), ss. 208(3)(b), 225(2) (with ss. 16(6), 179, 222(3), Sch. 22 para. 1, Sch. 23 para. 6)
Pt. I: definition of "public gas supplier" applied (E.W.) (1.12.1991) by Water Resources Act 1991 (c. 57, SIF 130), ss. 178, 225(2), Sch. 22 para. 1(4)(e) (with ss. 16(6), 179, 222(3), Sch. 22 para. 1, Sch. 23 para. 6)
Pt. I applied (1.3.1996) by 1995 c. 45, s. 6(7); S.I. 1996/218, art. 2
Pt. I applied (1.3.1996) by 1995 c. 45, s. 16(1), Sch. 4 para. 1; S.I. 1996/218, art. 2
S. 20 repealed (1.3.1996) by 1995 c. 45, ss. 10(1), 17(5), Sch. 3 para. 17, Sch. 6; S.I. 1996/218, art. 2
S. 19 cross-heading substituted (10.11.2011) by The Electricity and Gas (Internal Markets) Regulations 2011 (S.I. 2011/2704), regs. 1(1), 8(1)