Part VIII

Buildings, etc.

Disused petrol containers.
94
1
Where a fixed tank or other fixed container which has been used for the storage of petrol and is no longer used for that purpose (in this section referred to as a “disused petrol container”) is kept in any lands or premises, the occupier of the lands or premises (or, where the lands or premises are unoccupied, the owner) shall take all such steps as may be reasonably necessary to prevent danger from the container.
2
The local authority for the area in which are situated the lands or premises in which there is a disused petrol container may by notice in writing require the occupier (or, as the case may be, the owner) of the lands or premises to comply with subsection (1) above within such reasonable time as may be specified in the notice.
3
An authorised officer of a local authorityshall be entitled, at any reasonable time, on producing his authorisation to any person for the time being in charge of any lands or premises in the area of the authority in which there is a disused petrol container to enter the lands or premises for the purpose of determining whether subsection (1) above is being complied with.
4
This section shall not apply to lands or premises situated within the jurisdiction of a harbour authority (as defined in section 57 of the Harbours Act 1964).
5
In this section “petrol” has the meaning given by regulation 2 of the Petroleum (Consolidation) Regulations 2014.
Words in s. 94(2)(3) substituted (1.4.1996) by 1994 c. 39, s. 180(1), Sch. 13 para. 129(12); S.I. 1996/323, art. 4(1)(c)
Act partly in force at Royal Assent see s. 137(2); Act wholly in force at 1. 1. 1985 see S.I. 1983/201 as amended by S.I. 1984/573 and 744.
Act (except s. 16 which applies to England and Wales) applies to Scotland only see s. 137(9).
Act excluded (19. 12. 1991) by City of Edinburgh District Council Order Confirmation Act (c. xix), ss. 1, 12(2), Sch. Pt. V
Word in s. 94(1) substituted (1.10.2014) by The Petroleum (Consolidation) Regulations 2014 (S.I. 2014/1637), reg. 1(2), Sch. 4 para. 4(1) (with reg. 3(1))
Words in s. 94(4) substituted (1.10.2014) by The Petroleum (Consolidation) Regulations 2014 (S.I. 2014/1637), reg. 1(2), Sch. 4 para. 4(2) (with reg. 3(1))
S. 94(5) substituted (1.10.2014) by The Petroleum (Consolidation) Regulations 2014 (S.I. 2014/1637), reg. 1(2), Sch. 4 para. 4(3) (with reg. 3(1))