PART I

Licensing—General Provisions

Interpretation of Parts I and II
8
In this Part and in Part II of this Act except where the oontext otherwise requires—
- "chief constable" means, in relation to a licensing authority's area, the chief constable for the area which includes the area of the licensing authority;
- " fire authority " means, in relation to a licensing authority's area, the authority discharging in that area the functions of fire authority under the Fire Services Acts 1947 to 1959 ;
- " licence " means a licence granted under this Part and Part II of this Act, and cognate expressions shall be construed accordingly;
- " premises " includes land.