Part V

Fire Precautions

Firemen’s switches

Firemen’s switches for luminous tube signs.
10. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Pt. I: functions of local authority not to be responsibility of an executive of the authority (E.) (16.11.2000) by virtue of S.I. 2000/2853, reg. 2(1), Sch. 1
Pt. III: functions of local authority not to be responsibility of an executive of the authority (E.) (16.11.2000) by virtue of S.I. 2000/2853, reg. 2(1), Sch. 1
S. 10 repealed (1.10.2006) by The Regulatory Reform (Fire Safety) Order 2005 (S.I. 2005/1541), art. 1(3), Sch. 2 para. 26(2), Sch. 4 (with art. 49) (as amended by The Regulatory Reform (Fire Safety) Subordinate Provisions Order 2006 (S.I. 2006/484), arts. 1(1), 2)