Energy Conservation Act 1981 (repealed)
1981 c. 17
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Part I

Type approval of certain Energy-consuming Appliances

Power to prohibit supply of certain appliances without type approval mark or approved operating and maintenance instructions.
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

United KingdomU.K. requirements for type approval and approval of operating and maintenance instructions.
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

United KingdomU.K. type approval bodies.
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

United KingdomU.K. type approval and approval of operating and maintenance instructions.
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Control of conformity to approved type or instructions.
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Withdrawal of United KingdomU.K. approvals on change of standards under section 2.
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Supervision by the Secretary of State of United KingdomU.K. type approval bodies.
7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Interpretation of Part I.
8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Part II

Individual Testing of Certain Heat Generators

On-site testing orders.
9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Deferment of tests and modification of test standards.
10. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Testing authorities.
11. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Obligations of suppliers of generators subject to on-site testing.
12. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Data plates for approved generators.
13. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Interpretation of Part II.
14. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Part III

Miscellaneous and Supplemental

Grants for purposes of energy conservation advice schemes.
15. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Alleviation of charges for abstraction of water in certain cases.
16. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Contravention of orders.
17. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Saving for civil rights.
18. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Exception of certain approved performance particulars from trade descriptions law.
19. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Enforcement of orders under Part I.
20. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Enforcement of orders under Part II.
21. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Obstruction of enforcement officers and authorised inspectors.
22. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Notice of test.
23. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Compensation for loss, et ceteralaetc., of appliance seized under section 20.
24. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Offences by corporations.
25. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Orders.
26. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Interpretation.
27. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Application to Northern Ireland.
28. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Citation.
29. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Act repealed (22.7.2004) by Statute Law (Repeals) Act 2004 (c. 14), Sch. 1 Pt. 16 Group 2