Energy Conservation Act 1981 (repealed)
1981 CHAPTER 17
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Act repealed (22.7.2004) by Statute Law (Repeals) Act 2004 (c. 14), Sch. 1 Pt. 16 Group 2

Part I Type approval of certain Energy-consuming Appliances

1 Power to prohibit supply of certain appliances without type approval mark or approved operating and maintenance instructions.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2 United KingdomU.K. requirements for type approval and approval of operating and maintenance instructions.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3 United KingdomU.K. type approval bodies.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4 United KingdomU.K. type approval and approval of operating and maintenance instructions.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5 Control of conformity to approved type or instructions.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6 Withdrawal of United KingdomU.K. approvals on change of standards under section 2.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7 Supervision by the Secretary of State of United KingdomU.K. type approval bodies.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

8 Interpretation of Part I.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Part II Individual Testing of Certain Heat Generators

9 On-site testing orders.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

10 Deferment of tests and modification of test standards.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

11 Testing authorities.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

12 Obligations of suppliers of generators subject to on-site testing.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

13 Data plates for approved generators.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

14 Interpretation of Part II.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Part III Miscellaneous and Supplemental

15 Grants for purposes of energy conservation advice schemes.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

16 Alleviation of charges for abstraction of water in certain cases.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

17 Contravention of orders.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

18 Saving for civil rights.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

19 Exception of certain approved performance particulars from trade descriptions law.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

20 Enforcement of orders under Part I.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

21 Enforcement of orders under Part II.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

22 Obstruction of enforcement officers and authorised inspectors.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

23 Notice of test.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

24 Compensation for loss, et ceteralaetc., of appliance seized under section 20.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

25 Offences by corporations.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

26 Orders.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

27 Interpretation.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

28 Application to Northern Ireland.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

29 Citation.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .