Part VIA

Quality of Water

Domestic distribution failures where water is supplied to the public by private supply
76FA. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Pt. VIA (ss. 76A–76L) inserted by Water Act 1989 (c. 15, SIF 130), s. 168, Sch. 22 (with ss. 58(7), 101(1), 141(6), 160(1)(2)(4), 163, 189(4)–(10), 190, 193(1), Sch. 26 paras. 3(1)(2), 17, 40(4), 57(6), 58)
S. 76FA title substituted (1.1.2015) by The Public Water Supplies (Scotland) Regulations 2014 (S.S.I. 2014/364), regs. 1(1), 48(c) (with reg. 1(3)(4))
S. 76FA omitted (27.10.2017) by virtue of The Water Intended for Human Consumption (Private Supplies) (Scotland) Regulations 2017 (S.S.I. 2017/282), reg. 1(1), sch. 10 para. 1(2) (with reg. 2)