Part V

Houses, Etc., to be Supplied with Water
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 67
S. 67 repealed (4.1.1995) by 1994 c. 39, s. 180(1)(2), Sch. 13 para. 119(34), Sch. 14 (with s. 179); S.I. 1994/2850, art. 3(d), Sch. 3