SCHEDULES
SCHEDULE 10
1
Regulations under section 37 of the Coal Industry Nationalisation Act 1946.
2
Regulations under section 67 of the National Insurance Act 1946.
3
Regulations under section 68 of the National Health Service Act 1946, and orders under section 11(9) or section 31(5) of that Act.
4
Regulations under section 67 of the National Health Service (Scotland) Act 1947.
5
Regulations under Schedule 5 to the Fire Services Act 1947.
6
Regulations under section 101 of the Transport Act 1947.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 7
8
Regulations under section 140 of the Local Government Act 1948, and such regulations as applied by any local Act, whether passed before or after this Act.
9
Regulations under subsection (1) or subsection (2) of section 60 of the National Assistance Act 1948.
10
Rules under section 3 of the Superannuation (Miscellaneous Provisions) Act 1948.
11
Subsections (3) and (5) of section 58 of the Gas Act 1948, and regulations under section 60 of that Act.
12
Subsection (4) of section 6 of the Commonwealth Telegraphs Act 1949 and regulations under that section.
13
Regulations under section 25 of the Prevention of Damage by Pests Act 1949.
14
Regulations under section 42 of the Justices of the Peace Act 1949.
15
Regulations under section 27 or section 28 of the Transport Act 1953.
16
Regulations under section 24 of the Iron and Steel Act 1953.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 17
18
Orders under section 23 of the Local Government Act 1958 and regulations under section 60 of that Act.
19
Regulations under section 1 of the Water Officers Compensation Act 1960.
20
Regulations under section 18(6) of the Land Drainage Act 1961.
21
Subsection (6) of section 74 of the Transport Act 1962 and orders under that section, regulations under section 81 of that Act, and paragraph 17(3) of Schedule 7 to that Act.
22
Orders under section 84 of the London Government Act 1963 and regulations under section 85 of that Act.
23
Regulations under section 106 of the Water Resources Act 1963.
Sch. 10 repealed (22.8.1996) by 1996 c. 17, ss. 45, 46, Sch. 3 Pt. I (with s. 38, Sch. 2 para. 6)
1946 c. 59.
1946 c. 67.
1946 c. 81.
1947 c. 27.
1947 c. 41.
1947 c. 49.
Sch. 10 paras. 7, 17 repealed by Electricity Act 1989 (c. 29, SIF 44:1), ss. 112(3)(4), Sch. 17 para. 35, Sch. 18
1948 c. 26.
1948 c. 29.
1948 c. 33.
1948 c. 67.
1949 c. 39.
1949 c. 55.
1949 c. 101.
1953 c. 13.
1953 c. 15.
Sch. 10 paras. 7, 17 repealed by Electricity Act 1989 (c. 29, SIF 44:1), ss. 112(3)(4), Sch. 17 para. 35, Sch. 18
1958 c. 55.
1960 c. 15.
1961 c. 48.
1962 c. 46.
1963 c. 33.
1963 c. 38.