SCHEDULES
SCHEDULE 1
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 1
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 7
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 9
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 10
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 11
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 12
13
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
The Control of Lead at Work Regulations 1980. | S.I. 1980/1248, | Reg. 16.
The Ionising Radiations Regulations 1985. | S.I. 1985/1333, | Reg. 16.
The Control of Substances Hazardous to Health Regulations 1988. | S.I. 1988/1657, | reg. 11.
Sch. 1 repealed (22.8.1996) by 1996 c. 18, ss. 242, 243, Sch. 3 Pt. I (with ss. 191-195, 202)
Provisions removed by S.I. 1980/1581, art. 3(2)
Provisions removed by S.I. 1988/1746, art. 3
Provisions removed by S.I. 1980/1581, art. 3(2)
Provisions removed by S.I. 1980/1581, art. 3(2)
Provisions removed by S.I. 1980/1581, art. 3(2)
Provisions removed by S.I. 1980/1581, art. 3(2)
Provisions removed by S.I. 1985/1787, art. 3
Provision added by S.I. 1980/1581, art. 4
Provision added by S.I. 1985/1787, art. 4
Provision added by S.I. 1988/1746, art. 4