SCHEDULES
SCHEDULE 20

Modification of Act in Relation to Fire Precautions

Steps mentioned in certain notices under the Fire Precautions Act 1971 to count as improvements for certain purposes of this Act
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Sch. 20 repealed (1.10.2006) by Regulatory Reform (Fire Safety) Order 2005 (S.I. 2005/1541), art. 1(3), Sch. 2 para. 13, Sch. 4 (with art. 49) (as amended by The Regulatory Reform (Fire Safety) Subordinate Provisions Order 2006 (S.I. 2006/484), arts. 1(1), 2)