Part VIII

Functions

The environment

Flood prevention and flood warning systems.
137
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
S. 137(1) repealed (1.4.1996) by 1994 c. 39, s. 180(1)(2), Sch. 13 para. 92(36), Sch. 14; S.I. 1996/323, art. 4(1)(c)(d), Sch. 2
S. 137(2) repealed by Local Government and Planning (Scotland) Act 1982 (c. 43), Sch. 4 Pt. I