Part XII

Miscellaneous and General

General
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 268
S. 268 repealed by House of Commons Disqualification Act 1975 (c. 24), Sch. 3 and Northern Ireland Assembly Disqualification Act 1975 (c. 25), s. 5(2), Sch. 3 Pt. I