Premises for which fire certificates are required

Right of appeal against, and coming into force of, notices under s. 3.
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Act repealed (E.W.) (1.10.2006) by Regulatory Reform (Fire Safety) Order 2005 (S.I. 2005/1541), art. 1(3), Sch. 2 para. 8, Sch. 4 (with art. 49) (as amended by The Regulatory Reform (Fire Safety) Subordinate Provisions Order 2006 (S.I. 2006/484), arts. 1(1), 2); (S.) (1.10.2006) by Fire (Scotland) Act 2005 (Consequential Modifications and Savings) Order 2006 (S.S.I. 2006/475), art. 1, Sch. 2 (with arts. 3, 4)
Act repealed (E.W.) (1.4.2006) by Regulatory Reform (Fire Safety) Order 2005 (S.I. 2005/1541), art. 1(3), Sch. 2 para. 8, Sch. 4 (with art. 49)