Part VIII

Miscellaneous and Supplementary Provisions

Facilities for microbiological examinations.
115A
A drugs authority or the council of a non-metropolitan district may provide facilities for microbiological examinations of drugs.
S. 115A inserted (E.W.S.) by Food Safety Act 1990 (c. 16, SIF 53:1, 2), ss. 54, 59(1), Sch. 3 para. 10
Pt. VIII (ss. 104–136) extended by S.I.s 1982/425, art. 3, 1984/187 art. 2; and extended with modifications by S.I. 1985/403, art. 3(1)
S. 115A applied (with modifications) (1.1.1995) by S.I. 1994/3144, reg.10, Sch. 4
Pt. VIII (ss. 104–136) extended by S.I. 1982/425, art. 3; and S.I. 1984/187 art. 2; and extended (with modifications) by S.I. 1985/403, art. 3(1)
Ss. 107-116 applied (with modifications) (1.5.2004) by Medicines for Human Use (Clinical Trials) Regulations 2004 (S.I. 2004/1031), regs. 1, 47, Schs. 9
Ss. 111-116 applied (with modifications) (30.10.2005) by
Medicines (Traditional Herbal Medicinal Products for Human Use) Regulations 2005 (S.I. 2005/2750)
,
regs. 1(a)
,
11
,
Schs. 4
(with
Sch. 6
)
Ss. 107-116 amendment to earlier affecting provision SI 2004/1031 reg. 47 Sch. 9 (29.8.2006) by Medicines for Human Use (Clinical Trials) Amendment Regulations 2006 (S.I. 2006/1928), regs. 1(1), 32