Smoke Control Areas

Miscellaneous amendments of procedure for making orders with respect to smoke control areas.
10
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5
In section 95(2) of the Housing Act 1964 (power of local authority after making an order under section 11 of the principal Act to designate unsuitable heating appliances which are not to qualify for adaptation grants in smoke control areas) for the words “after an order has been made by a local authority" there shall be substituted the words “after a local authority has resolved to make an order".
Act repealed (27.8.1993) by 1993 c. 11, ss. 67(3), 68(2), Sch.6
S. 10(1)–(3) repealed by Local Government, Planning and Land Act 1980 (c. 65, SIF 81:1, 2), s. 194, Sch. 34 Pt. II
S. 10(4) repealed by Local Government, Planning and Land Act 1980 (c.65, SIF 81:1, 2), s. 194, Sch. 34 Pt. II
The text of ss. 2(6), 5(1), 10(5), 14(2), Sch. 1 paras. 2, 5–8, 10, and Sch. 2 is in the form in which it was originally enacted: it was not reproduced in Statutes in Force and does not reflect any amendments or repeals which may have been made prior to 1.2.1991.
1964 c. 56.