PART I

General Provisions as to Sewerage

Miscellaneous

Buildings not to interfere with sewers
21
1
Unless with the consent of the local authority, which shall not be unreasonably withheld, no building shall be erected over, or in such a way as to interfere with or to obstruct access to, any sewer vested in the authority.
2
If any question arises as to whether consent under the foregoing subsection has been unreasonably withheld or as to what conditions should be attached to the consent, a person aggrieved may refer the question by summary application to the sheriff, whose decision in the matter shall be final.
3
In this section " building " has the same meaning as in section 29(1) of the Building (Scotland) Act 1959.
1959 c. 24.