Health, Safety and Welfare of Employees (General Provisions)

Lighting.
8
1
Effective provision shall be made for securing and maintaining, in every part of premises to which this Act applies in which persons are working or passing, sufficient and suitable lighting, whether natural or artificial.
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3
All glazed windows and skylights used for the lighting of any part of premises to which this Act applies in which work, or through which pass, any of the persons employed to work in the premises shall, so far as reasonably practicable, be kept clean on both the inner and outer surfaces and free from obstruction; but this subsection shall not affect the white-washing or shading of windows or skylights for the purpose of mitigating heat or glare.
4
All apparatus installed at premises to which this Act applies for producing artificial lighting thereat in parts in which the securing of lighting is required by this section to be provided for shall be properly maintained.
S. 8 extended by Radiological Protection Act 1970 (c. 46), s. 2(6)
Ss. 4-16 repealed (1.1.1993 with respect to certain premises and 1.1.1996 with respect to certain further premises) by S.I. 1992/3004, regs. 1(2)(3), 2, 3, 27(1), Sch. 2 Pt.I (with saving in reg. 27(2)).
Ss. 3(3), 4(3), 6(5), 7(2), 8(2), 9(3)(4), 10(3)(4), 12(3), 20–22, 23(2), 25, 26, 27(3), 42(8)–(10), 43(6)–(8), 45, 46(12)(14), 49(2), 50, 54, 56–58, 61, 62, 65, 66, 68, 70(2)–(4), 71(1), 74(2)–(4), 75(2), 80(5)(6)(8), 81, Sch. 1 repealed by S.I. 1974/1943, reg. 4, Sch. 1