Health, Safety and Welfare of Employees (General Provisions)

Cleanliness.
4
1
All premises to which this Act applies, and all furniture, furnishings and fittings in such premises shall be kept in a clean state.
2
No dirt or refuse shall be allowed to accumulate in any part of premises to which this Act applies in which work, or through which pass, any of the persons employed to work in the premises; and the floors of, and any steps comprised in, any such part as aforesaid shall be cleaned not less than once a week by washing or, if it is effective and suitable, by sweeping or other method.
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4
Subsection (2) of this section shall not
be construed as being in derogation of the general obligation imposed by subsection (1) of this section.
5
Nothing in this section or in regulations thereunder shall apply to fuel storage premises which are wholly in the open, and, in the case of such premises which are partly in the open, so much of them as is in the open shall, for the purposes of this section and of such regulations, be treated as not forming part of the premises.
S. 4 extended by Radiological Protection Act 1970 (c. 46), s. 2(6)
Ss. 4-16 repealed (1.1.1993 with respect to certain premises and 1.1.1996 with respect to certain further premises) by S.I. 1992/3004, regs. 1(2)(3), 2, 3, 27(1), Sch. 2 Pt.I (with saving in reg. 27(2)).
Ss. 3(3), 4(3), 6(5), 7(2), 8(2), 9(3)(4), 10(3)(4), 12(3), 20–22, 23(2), 25, 26, 27(3), 42(8)–(10), 43(6)–(8), 45, 46(12)(14), 49(2), 50, 54, 56–58, 61, 62, 65, 66, 68, 70(2)–(4), 71(1), 74(2)–(4), 75(2), 80(5)(6)(8), 81, Sch. 1 repealed by S.I. 1974/1943, reg. 4, Sch. 1
Words substituted by S.I. 1974/1943, Sch. 2 para. 1