Part 1

Preliminary

Interpretation
2
In this Act—
- “the 1978 Act” means the Refuse Disposal (Amenity) Act 1978 (c. 3);
- “borough council” means London borough council and includes the Common Council of the City of London in its capacity as a local authority and “borough” and “council” shall be construed accordingly;
- “operational land” has the same meaning as in the Town and Country Planning Act 1990 (c. 8).