Part V

Registration of door supervisors

Enforcement under Part V
39
1
If the holder of a licence in respect of licensed premises, or any person concerned in the conduct or management of such premises, employs a person as a door supervisor who is not currently registered with the council he shall be guilty of an offence and shall be liable on summary conviction to a fine not exceeding level 5 on the standard scale.
2
Any person who is employed on licensed premises as a door supervisor without being currently registered with the council shall be guilty of an offence and shall be liable on summary conviction to a fine not exceeding level 4 on the standard scale.
3
Any person who—
a
contravenes any of the conditions of his registration; or
b
resists or intentionally obstructs any person in the execution of his duties under this Part of this Act; or
c
in connection with his application for registration makes a statement which he knows to be false in a material particular,
shall be guilty of an offence and shall be liable on summary conviction to a fine not exceeding level 4 on the standard scale.