Part II Works

11 Subsidiary works
(1) Subject to the provisions of this Act the Corporation may, for the purposes of Tramlink and associated traffic control—
(a) within the limits of deviation make, lay down, place, erect, repair, alter, renew, maintain, operate and use rails, rail fixings, plates, sleepers, channels, conduits, tubes, stations, platforms, islands, gates, junctions, points, turntables, turnouts, crossings, temporary or permanent cross-overs, passing places, pillars, posts, poles, brackets, wires, subways, manholes, shafts, engines, dynamos, substations, transformers, switchgear, cabling, signalling, monitoring and communications equipment, together with subsidiary and incidental machinery, apparatus, works and appliances; and
(b) in, or under any street in which it may be necessary or convenient, or in other land over which the Corporation have or obtain sufficient rights, lay, place, form, erect, maintain, renew and repair drains, ditches and culverts, electric wires, conductors, cables, brackets, posts, tubes, substations, boxes and other electrical apparatus for connecting the authorised railways and associated works with any electricity generating station or substations or for the purposes of signalling, monitoring and communication in connection with Tramlink.
(2) The provisions of sections 158 and 159 of, and paragraph 3 of Schedule 13 to, the Water Industry Act 1991 (street works) shall apply to apparatus and works referred to in subsection (1) above as they apply to relevant pipes and service pipes but as if—
(a) for any reference to a water undertaker there were substituted a reference to the Corporation; and
(b) paragraph 3 (6) of Schedule 13 were omitted.
1991 c. 56.
(3) The Corporation may, for the purposes of Tramlink, alter, renew and maintain the parapet of any bridge under which the authorised railways are to be situated, or construct any other works for the safety of persons passing over any such bridge.
(4) In constructing stations and stopping places for the purposes of Tramlink the Corporation shall make provision, in so far as it is in the circumstances both practicable and reasonable and without prejudice to any requirement having effect under or by virtue of the Chronically Sick and Disabled Persons Act 1970, for the needs of members of the public using Tramlink who are disabled or elderly.
1970 c. 44.
(5) Nothing in this section shall prejudice the generality of sections 6 (Power to make works) and 7 (Further works and powers) of this Act.