SCHEDULE 3 Content of notice of intention to award to the existing provider under Direct Award Process C
Regulation 9(4)
1 A statement that the relevant authority is intending to award a contract to an existing provider following Direct Award Process C.
2 The contract title and reference.
3 The name and address of the registered office or principal place of business of the provider to whom an award is to be made.
4 A description of the relevant health care services to which the contract relates, including the most relevant CPV code.
5 The approximate lifetime value of the contract.
6 Details of the award decision-makers.
7 A statement explaining the award decision-makers’ reasons for selecting the chosen provider, with reference to the key criteria.
8 Any declared conflicts or potential conflicts of interest.
9 Information as to how any conflicts or potential conflicts of interest were managed.